Errata

Chapter 2

1. Equation (2.29) should read:

‖l‖_V 0 = sup vh∈V h\{0} ⟨l, v^h⟩ ‖v^h‖_V Chapter 3

1. On page 27, line 7 should read: ‘A discussion on randomized algorithms to compute Voronoi diagrams and Delaunay tessellations can be found in Mulmuley (1994).’

2. Equation (3.32c) on page 52 is incorrect. The corrected equation is:

ϕ_3(ξ) = lim_{L→∞}

2δ_3 L + 2δ_1 + 2δ_2 + 2δ_3 .

3. Line 8 on page 68 should read: ‘. . . we focus our attention on . . . ’

Chapter 4

1. Line 3 on page 78 should read: ‘. . . Γ = Γ_u ∪ Γ_t and Γ_u ∩ Γ_t = Ø.’

Chapter 6

1. A typographical error on the first line of page 173. The corrected sentence is:

‘We consider the interpolation schemes for the displacements and the pressure in the mixed natural element method.’

2. Equation (6.23c) is:

a(u, u) =^�œ(u), ”(u)^�= 2μ^�”(u), ”(u)^� − (p, div u)

Chapter 7

1. The second paragraph on page 192 should start as: ‘The application of the C^0 natural element method . . . ’

2. The last line on page 193 should read: ‘The satisfaction of the ellipticity condition was met, with the ellipticity constant α being the square of fundamental frequency of the clamped plate.’